# -------------------------------------------------------------------
#
# Copyright (C) 2005-2015 by Global Phasing Limited
#
# This code is distributed under the terms and conditions of the CCP4
# Program Suite Licence Agreement as a CCP4 Application.  A copy of
# the CCP4 licence can be obtained by writing to the CCP4 Secretary,
# Daresbury Laboratory, Warrington WA4 4AD, UK.
#
# Authors: (2005-2015) Clemens Vonrhein
#
# -------------------------------------------------------------------

#CCP4I VERSION CCP4Interface 1.3.20
#CCP4I SCRIPT DEF autoSHARP
#CCP4I DATE 14 Jun 2005  14:10:27
#CCP4I USER vonrhein

#CCP4i_cvs_Id $Id: autoSHARP.def,v 1.11 2015/03/07 11:23:21 vonrhein Exp $

autoSHARP_titl		_text50		"autoSHARP run"
autoSHARP_jobi		_positiveint	0
TITLE			_title_text	"autoSHARP"
autoSHARP_type		_autosharp_type "MAD"
autoSHARP_molw		_positivereal   0.0
autoSHARP_nres		_positiveint    0
autoSHARP_pirf		_pir_file       ""
DIR_autoSHARP_pirf	_default_dirs  ""
autoSHARP_spgr		_autosharp_spgr "None"
autoSHARP_res		_logical	0
autoSHARP_resl		_resolution     "9999.0"
autoSHARP_resh		_resolution     "0.01"
autoSHARP_nset		_positiveint    0
autoSHARP_user		_text50         ""
autoSHARP_ulvl		_positiveint    3
autoSHARP_chtm		_text           "no"
autoSHARP_csum		_text           "no"
autoSHARP_rate		_autosharp_rate "5"
autoSHARP_viewer	_autosharp_viewer "NONE"
autoSHARP_pdbf		_pdb_file       ""
DIR_autoSHARP_pdbf	_default_dirs  ""

autoSHARP_EntryPoint             _positiveint 2
autoSHARP_EntryPoint3_Path       _autosharp_entrypoint3_path 83
autoSHARP_EntryPoint3_Path3_Opt  _positiveint 8
autoSHARP_DetectPgm		 _autosharp_detectpgm "shelx"

autoSHARP_iden,0		_text          "peak"
autoSHARP_iden,1		_text          "infl"
autoSHARP_iden,2		_text          "hrem"
autoSHARP_iden,3		_text          "lrem"
autoSHARP_wave,0		_positivereal  1.5418
autoSHARP_wave,1		_positivereal  1.5418
autoSHARP_hatm,0		_text          "Se"
autoSHARP_hatm,1		_text          "Se"
autoSHARP_nsit,0		_positiveint   2
autoSHARP_nsit,1		_positiveint   2
autoSHARP_sitf_mad		_HATOM_file      ""
autoSHARP_sitf,0		_HATOM_file      ""
autoSHARP_sitf,1		_HATOM_file      ""
autoSHARP_fone,0		_real          0.0
autoSHARP_fone,1		_real          0.0
autoSHARP_ftwo,0		_real          0.0
autoSHARP_ftwo,1		_real          0.0
autoSHARP_fmid,0		_mtz_label_f   "F"
autoSHARP_fmid,1		_mtz_label_f   "F"
autoSHARP_smid,0		_mtz_label_sig "SIGF"
autoSHARP_smid,1		_mtz_label_sig "SIGF"
autoSHARP_dano,0		_mtz_label_d   "DANO"
autoSHARP_dano,1		_mtz_label_d   "DANO"
autoSHARP_sano,0		_mtz_label_dw  "SIGDANO"
autoSHARP_sano,1		_mtz_label_dw  "SIGDANO"
autoSHARP_isym,0		_mtz_label_y   "ISYM"
autoSHARP_isym,1		_mtz_label_y   "ISYM"
autoSHARP_dtyp,0		_text          "MTZ"
autoSHARP_dtyp,1		_text          "MTZ"
autoSHARP_data,0		_RFL_file      ""
autoSHARP_data,1		_RFL_file      ""
autoSHARP_data_mtz,0		_MTZ_file      ""
autoSHARP_data_mtz,1		_MTZ_file      ""
autoSHARP_data_sca,0		_sca_file      ""
autoSHARP_data_sca,1		_sca_file      ""
DIR_autoSHARP_data,0		_default_dirs  ""
DIR_autoSHARP_data,1		_default_dirs  ""
DIR_autoSHARP_data_mtz,0	_default_dirs  ""
DIR_autoSHARP_data_mtz,1	_default_dirs  ""
DIR_autoSHARP_data_sca,0	_default_dirs  ""
DIR_autoSHARP_data_sca,1	_default_dirs  ""
DIR_autoSHARP_sitf_mad		_default_dirs  ""
DIR_autoSHARP_sitf,0		_default_dirs  ""
DIR_autoSHARP_sitf,1		_default_dirs  ""
autoSHARP_LABIN,0		_text	       "FMID SMID DANO SANO ISYM"
autoSHARP_LABIN,1		_text	       "FMID SMID DANO SANO ISYM"

autoSHARP_cel1,0          _positivereal           ""
autoSHARP_cel2,0          _positivereal           ""
autoSHARP_cel3,0          _positivereal           ""
autoSHARP_cel4,0          _positivereal           ""
autoSHARP_cel5,0          _positivereal           ""
autoSHARP_cel6,0          _positivereal           ""
autoSHARP_cel1,1          _positivereal           ""
autoSHARP_cel2,1          _positivereal           ""
autoSHARP_cel3,1          _positivereal           ""
autoSHARP_cel4,1          _positivereal           ""
autoSHARP_cel5,1          _positivereal           ""
autoSHARP_cel6,1          _positivereal           ""

autoSHARP_data_format		_autosharp_data_format "MTZ"
