#
#     Copyright (C) 1999-2004  Liz Potterton, Peter Briggs
#
#     This code is distributed under the terms and conditions of the
#     CCP4 Program Suite Licence Agreement as a CCP4 Library.
#     A copy of the CCP4 licence can be obtained by writing to the
#     CCP4 Secretary, Daresbury Laboratory, Warrington WA4 4AD, UK.
#
#CCP4i_cvs_Id $Id$
#CCP4I VERSION CCP4Interface 1.1
#CCP4I SCRIPT DEF edit_dname
#CCP4I DATE  05/12/99 16:05:30
#CCP4I USER lizp

TITLE			_title_text		""
INPUT_FILES		_list_of_text		HKLIN
OUTPUT_FILES		_list_of_text		HKLOUT
HKLIN			_MTZ_file		""
DIR_HKLIN		_default_dirs		""
HKLOUT			_MTZ_file		""
DIR_HKLOUT		_default_dirs		""

# column info
NLABIN			_positiveint		1
LABIN,0			_mtz_label		""
ASSOC,0	        	_mtz_assoc      	""
ASSOCX,0	       	_mtz_crystalname      	""
ASSOCD,0	       	_mtz_datasetname      	""
LABIN,1                 _mtz_label              ""
ASSOC,1                 _mtz_assoc              ""
ASSOCX,1	       	_mtz_crystalname      	""
ASSOCD,1	       	_mtz_datasetname      	""

# dataset info
N_DNAME			_positiveint		0
DNAME_MENU	        _menu			""
# setid contains original set ID for use with DPNAME,DCELL,DWAVE keywords
# Don't change it.
SETID,0			_positiveint	        0
SETID,1			_positiveint    	0
PNAME,0			_mtz_projectname	""
PNAME,1			_mtz_projectname	""
XNAME,0			_mtz_crystalname	""
XNAME,1			_mtz_crystalname	""
DNAME,0			_mtz_datasetname	""
DNAME,1			_mtz_datasetname	""
DCELL_1,0               _cell_length            ""
DCELL_1,1               _cell_length            ""
DCELL_2,0               _cell_length            ""
DCELL_2,1               _cell_length            ""
DCELL_3,0               _cell_length            ""
DCELL_3,1               _cell_length            ""
DCELL_4,0               _cell_angle             ""
DCELL_4,1               _cell_angle             ""
DCELL_5,0               _cell_angle             ""
DCELL_5,1               _cell_angle             ""
DCELL_6,0               _cell_angle             ""
DCELL_6,1               _cell_angle             ""
DWAVE,0			_positivereal     	""
DWAVE,1			_positivereal     	""
# flag to indicate that parameters shouldn't be updated
# in the task window on loading the file
EDIT_DNAME_NO_UPDATE	_logical		0
