#
#     Copyright (C) 1999-2004  Liz Potterton, Peter Briggs
#
#     This code is distributed under the terms and conditions of the
#     CCP4 Program Suite Licence Agreement as a CCP4 Library.
#     A copy of the CCP4 licence can be obtained by writing to the
#     CCP4 Secretary, Daresbury Laboratory, Warrington WA4 4AD, UK.
#
#CCP4i_cvs_Id $Id$
#CCP4I VERSION CCP4Interface 0.11
#CCP4I SCRIPT DEF mapave
#CCP4I DATE  25/06/98 16:05:30
#CCP4I USER lizp

INPUT_FILES 	_list_of_text		"HKLIN MSKIN"
OUTPUT_FILES	_list_of_text		"MAPOUT"

MAPIN		_map_file		""
DIR_MAPIN	_default_dirs		""
MSKIN           _mask_file              ""
DIR_MSKIN       _default_dirs           ""

HKLIN		_MTZ_file		""
DIR_HKLIN	_default_dirs		""
LABIN		_text 			"F1 SIG1 PHI W"
F1              _mtz_label_f            ""
SIG1            _mtz_label_sig          ""
PHI             _mtz_label_phi          ""
W               _mtz_label_w            ""

MAPOUT 		_map_file               ""
DIR_MAPOUT 	_default_dirs           MAP_DEFAULT
MSKOUT 		_mask_file              ""
DIR_MSKOUT 	_default_dirs           MAP_DEFAULT

TITLE       		_title_text     ""
MAPAVE_INPUT		_mapave_input	MTZ
MAPAVE_MODE		_mapave_mode	GRAPHICS
SPACE_GROUP     	_space_group    ""
XYZLIM_1        	_real   	""
XYZLIM_2        	_real   	""
XYZLIM_3        	_real  	 	""
XYZLIM_4        	_real   	""
XYZLIM_5        	_real   	""
XYZLIM_6        	_real   	""
MAPROT_MODE		_text			FROM
MAPROT_MAP_TYPE         _text                   WORK
IFGRID			_logical		0
GRID_1			_positiveint		""
GRID_2			_positiveint		""
GRID_3			_positiveint		""
CELL_1			_cell_length		""
CELL_2			_cell_length		""
CELL_3			_cell_length		""
CELL_4			_cell_angle		""
CELL_5			_cell_angle		""
CELL_6			_cell_angle		""
NCS_NOPS		_positiveint		1
NCS_OP_CONVENTION,0     _text                   EULER
NCS_OP_ALPHA,0		_real			""
NCS_OP_BETA,0		_real			""
NCS_OP_GAMMA,0		_real			""
NCS_OP_XTRAN,0		_real			""
NCS_OP_YTRAN,0		_real			""
NCS_OP_ZTRAN,0		_real			""
NCS_OP_CONVENTION,1     _text                   EULER
NCS_OP_ALPHA,1          _real                   0.0
NCS_OP_BETA,1           _real                   0.0
NCS_OP_GAMMA,1          _real                   0.0
NCS_OP_XTRAN,1          _real                   0.0
NCS_OP_YTRAN,1          _real                   0.0
NCS_OP_ZTRAN,1          _real                   0.0

SCALE			_real			""

N_COVERED_MOLS		_positiveint		1
FRAC_SOLVENT		_fraction		""
NNCS			_positiveint		""

RADIUS			_positivereal		8.0
VOLUME			_fraction		""
IFPEAK			_logical		1
PEAK			_positiveint		1

