#options
shift_options {
   shift_weight = 1;
   shift_tol = 0;
   shift_nprint = 1;
   shift_flag_h = 0;
   shift_flag_ha = 0;
   shift_flag_n = 0;
   shift_flag_ca = 1;
   shift_flag_cb = 0;
   shift_flag_c = 0;
   shift_logfile = shiftx ;
}

#chemical shifts
shift{3,  8.28,  4.32, 116.96, 56.52, 39.48, 176.45}
shift{4,  7.65,  3.57, 119.28, 66.01, 31.65, 178.06}
shift{5,  8.41,  3.97, 118.22, 59.31, 31.80, 179.25}
shift{6,  8.01,  4.01, 121.27, 54.91, 18.28, 179.87}
shift{7,  8.36,  3.94, 117.45, 59.66, 32.02, 179.68}
shift{8,  8.00,  3.73, 120.29, 64.25, 36.77, 178.27}
shift{9,  8.05,  3.92, 119.66, 59.31, 29.01, 177.58}
shift{10,  8.21,  4.45, 118.15, 56.38, 41.31, 177.33}
